1998 2000 2002 2004 2006 2008 2010 2012 2014 -15 -10 -5 0 5 10 15 20 25 30

Position (mm)

Data CAS1.mit.dfixd_frame+CAS1.mit.lfixd_frame North

WRMS: 2.11 mm NRMS: 1.27 #: 11061 data Rate: -9.71 +- 0.00 mm/yr

1998 2000 2002 2004 2006 2008 2010 2012 2014 -15 -10 -5 0 5 10 15 20 25 30

Position (mm)

Data CAS1.mit.dfixd_frame+CAS1.mit.lfixd_frame East

WRMS: 1.44 mm NRMS: 0.99 #: 11061 data Rate: 1.51 +- 0.00 mm/yr

1998 2000 2002 2004 2006 2008 2010 2012 2014 -30 -20 -10 0 10 20 30 40 Data CAS1.mit.dfixd_frame+CAS1.mit.lfixd_frame Up

WRMS: 6.11 mm NRMS: 1.24 #: 11061 data Rate: 0.88 +- 0.01 mm/yr